         174           8
   20.1842538609801        20.2084928898877        19.9427444482086     
   19.7394686172070        19.5509579829470        19.3872994211822     
   19.2289122190563        19.0665516369478     
  -6.85708833094522       -6.37740037163941       -6.09390876979006     
  -5.77297418649377       -5.47982542102800       -5.18893651731904     
  -4.89102850908850       -4.55784717535225     
 -7.972144180534234E-003  0.000000000000000E+000
   1.01062806909555       0.000000000000000E+000
   1.01455234972892       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
