         180           8
   15.7035031979868        15.4552705872426        15.2237636707369     
   15.0094563101872        14.8374099759920        14.7449893952970     
   14.6035871782492        14.3186128319313     
  -8.19845400417951       -7.93138216343828       -7.77272405980913     
  -7.56513750637785       -7.33954841390502       -7.14005153851132     
  -6.84990592931338       -6.63051479729789     
 -7.864951918415401E-003  0.000000000000000E+000
   1.01018551545733       0.000000000000000E+000
   1.01437250585126       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
