         180           8
   18.0497792950988        17.4140245185306        17.1485199341502     
   16.4422395244672        15.3888932078357        14.6122628647203     
   14.3567385518887        14.6851340141793     
  -5.00814609566432       -3.97513362723795       -4.25685813005097     
  -4.00280300491604       -3.47680445238698       -3.16395026106978     
  -2.94379476648473       -2.88093899804517     
  1.053795348779956E-003  0.000000000000000E+000
  0.987412914805150       0.000000000000000E+000
  0.984295976477785       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
