         180           8
   12.5994807471904        12.4193491325067        12.2808172194502     
   12.1099643695045        11.9730024597025        11.8918818591305     
   11.7983634917942        11.7804925036493     
  -7.60870295685653       -7.41619571706076       -7.21675915179909     
  -6.99849436933610       -6.74715171285517       -6.56119856726878     
  -6.41195177196035       -6.09894769153099     
 -7.772938964860579E-003  0.000000000000000E+000
   1.00975290494329       0.000000000000000E+000
   1.01394243237381       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
