         180           8
   15.2935240856331        14.5636905099870        13.8295640103000     
   13.0496974131048        12.3665413131062        11.6956163307583     
   11.0133138482437        10.3646338384305     
  -6.49148447075440       -6.57067950257265       -6.63891499289229     
  -6.74412357692947       -6.89371198557773       -7.04606404877600     
  -7.16947607690900       -7.24482481503290     
 -7.849239060287585E-003  0.000000000000000E+000
   1.01057090539539       0.000000000000000E+000
   1.01509319722422       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
