         180           8
   17.6425222309816        16.9852621625611        16.1976959062082     
   15.4244957947915        14.7273447736345        14.0532529719417     
   13.3058841997247        12.8315181362850     
  -6.79993650062906       -6.90590508484992       -6.94838522625371     
  -7.03575100351677       -7.22097785192074       -7.43306754125246     
  -7.57087064020872       -7.81881140659121     
 -7.740999854185646E-003  0.000000000000000E+000
   1.01051474627720       0.000000000000000E+000
   1.01474102403060       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
