         180           8
   19.7695029025389        18.9185338276613        18.2477952311053     
   17.5088222872148        16.7254824264969        16.0140798193393     
   15.3096250816645        14.5407814422084     
  -7.00061182907699       -7.08825638398882       -7.16893806858392     
  -7.29870878679467       -7.42162231667694       -7.58646516985287     
  -7.71834470826205       -8.01705037312760     
 -7.900866818076852E-003  0.000000000000000E+000
   1.01129507715312       0.000000000000000E+000
   1.01474704969536       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
