         180           3
   24.1876905158001        21.6443547860772        20.0546779721424     
  -4.52206267027665       -4.49020068287367       -4.68882902842641     
  2.220623242629532E-003  0.000000000000000E+000
  0.988179262294331       0.000000000000000E+000
  0.985138306297669       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
