         180           8
   16.8529193124596        16.0584698112413        15.3314356246287     
   14.6043076713373        13.8697317360536        13.1193928783777     
   12.3932974673862        11.6799646145823     
  -7.11697560120149       -7.12054224095732       -7.21827328277065     
  -7.32181672356345       -7.47908269509805       -7.59699787952498     
  -7.73079413892229       -7.87053124845949     
 -7.812960382663657E-003  0.000000000000000E+000
   1.01051521025702       0.000000000000000E+000
   1.01497940239075       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
