         180           8
   16.9844176082411        16.2255314371251        15.4703854312074     
   14.7429604130520        14.0461813140970        13.3623632145054     
   12.6945235561807        12.0285928076881     
  -7.15795745358045       -7.22957909015445       -7.28586792326581     
  -7.40173110910177       -7.58111845626735       -7.74873232042692     
  -7.91074113447416       -8.07662038489324     
 -7.890641493717650E-003  0.000000000000000E+000
   1.01086285299623       0.000000000000000E+000
   1.01509591232562       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
