         180           3
   25.3153789037028        22.3200050338480        19.9945438949631     
  -5.41773550907391       -5.51444513261586       -5.34313974536131     
  2.274241771439739E-003  0.000000000000000E+000
  0.988084567426140       0.000000000000000E+000
  0.985203135380091       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
