         180           8
   14.9457663441666        14.2403450387230        13.5292056811736     
   12.7382597359340        12.0074164832056        11.3079057665522     
   10.5977540894494        9.94525660275690     
  -6.95145396643141       -7.03946151657970       -7.12253039681381     
  -7.28865856656070       -7.42816738143371       -7.52310571974100     
  -7.62971289146624       -7.77255390686038     
 -8.080060986923675E-003  0.000000000000000E+000
   1.01100656982554       0.000000000000000E+000
   1.01487613512110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
