         180           3
   25.5382644285822        22.4370608948483        20.2146525113584     
  -6.65377208807520       -6.71574075409189       -6.71162907384301     
  2.555098560567866E-003  0.000000000000000E+000
  0.988068413727603       0.000000000000000E+000
  0.985273611569818       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
