         180           8
   17.1641480017307        16.5200186814019        15.6678178664144     
   14.8700394812406        14.2226133575078        13.5030780902313     
   12.7005519792449        11.9280280684349     
  -7.28545636256425       -7.48007524940116       -7.59517163416295     
  -7.71846666394737       -7.79891476278393       -7.96342485763333     
  -8.13129239140250       -8.25202515000713     
 -8.042047071629123E-003  0.000000000000000E+000
   1.01110661386446       0.000000000000000E+000
   1.01484891915637       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
