         180           8
   18.4178344496706        17.5378967334946        16.8161034070542     
   16.0460457244191        15.2669771813462        14.5835440345600     
   13.7511228485803        13.9944005101855     
  -7.13143671177052       -7.22459306768708       -7.32521888189195     
  -7.47719780996010       -7.58566738599625       -7.80025800937280     
  -8.01169061958526       -8.71646233572111     
 -8.023126416799085E-003  0.000000000000000E+000
   1.01140281157514       0.000000000000000E+000
   1.01534747919340       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
