         180           8
   22.8388639248980        21.9710137127724        21.1103624817308     
   20.3749239216694        19.6425273924472        18.9654009380255     
   18.2291695997633        17.6340132226053     
  -7.56030886957802       -6.12719381113749       -7.34870596403526     
  -7.79235257806770       -8.05411384232662       -8.31228941853731     
  -8.46063608936502       -8.67876569308996     
 -7.894492243875098E-003  0.000000000000000E+000
   1.01161872978992       0.000000000000000E+000
   1.01528364509286       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
