         180           3
   25.2708876442160        22.2753416257804        19.7198322372578     
  -5.96775823909048       -6.14665394569036       -6.16467640981770     
  2.584547431500497E-003  0.000000000000000E+000
  0.988325729215197       0.000000000000000E+000
  0.985401913248486       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
