         180           8
   23.1590191500535        22.1008301053868        21.2180347997339     
   20.4625908932164        19.7888646711452        19.0282168551099     
   18.2056256357074        17.6389910855735     
  -7.67004160939875       -6.31477330451892       -7.42286439154917     
  -7.73884017601511       -7.97897096064502       -8.20711984021323     
  -8.33803726307282       -8.60387264125550     
 -7.875174925361113E-003  0.000000000000000E+000
   1.01145130051374       0.000000000000000E+000
   1.01534966775130       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
