         180           3
   25.3836657041822        22.2797600004236        20.0034408055242     
  -5.41596550646963       -5.32476712924926       -5.51414979909719     
  2.265613975536522E-003  0.000000000000000E+000
  0.988285735443141       0.000000000000000E+000
  0.985473615364760       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
