         180           8
   15.3343409593342        14.5761574530819        13.8671539000146     
   13.1302529788966        12.3618107198028        11.6637408497976     
   11.0330250348794        10.3655321370295     
  -6.57656757514819       -6.54603218672583       -6.60542884268678     
  -6.71212521136191       -6.90234171787177       -7.12350590400304     
  -7.31096088350288       -7.52585636384319     
 -8.096015931407919E-003  0.000000000000000E+000
   1.01124896695639       0.000000000000000E+000
   1.01481026058918       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
