         180           8
   18.8811963224115        18.1974892793833        17.4540709830528     
   16.7527158809062        16.0048498179353        15.2121018062525     
   14.4659036343535        13.8161944273518     
  -6.69418159930865       -6.76680473941116       -6.86200223587194     
  -6.95517104189532       -7.11554960240914       -7.31086018467528     
  -7.49992573217501       -7.70162722076575     
 -8.032059463261382E-003  0.000000000000000E+000
   1.01133605215093       0.000000000000000E+000
   1.01520707545748       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
