         180           3
   26.1922371940195        23.7930835105890        21.1762049356227     
  -7.06779246533920       -8.42774904834140       -8.65171927149804     
  3.049765680886941E-003  0.000000000000000E+000
  0.988345166173633       0.000000000000000E+000
  0.985508639051339       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
