         180           8
   22.5413507095148        21.7419142476397        20.9950074623949     
   20.3162026481323        19.6200344140386        18.8931159680131     
   18.1444115501090        17.4809267131768     
  -7.47494659670611       -7.73239175833272       -8.07096655298582     
  -8.27034959288943       -8.43752240325221       -8.59270796737156     
  -8.77438059109001       -8.94270981123160     
 -7.973902249292751E-003  0.000000000000000E+000
   1.01150464844425       0.000000000000000E+000
   1.01554494057104       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
