         180           3
   26.0524003712811        23.0976920490399        20.0216590845051     
  -5.44614256851927       -5.55753135667134       -5.40565728852470     
  2.513493714185098E-003  0.000000000000000E+000
  0.988313815621354       0.000000000000000E+000
  0.985372384521530       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
