         180           8
   17.5934337760461        16.7890047882919        16.0116635435021     
   15.2535175072268        14.5210563020749        13.7383133960044     
   12.9738155639831        12.4563838112299     
  -6.20291984129166       -6.27846541954036       -6.36041230421222     
  -6.47061897319728       -6.64214990598079       -6.83004794116313     
  -7.00992358525220       -7.11333854750682     
 -7.774731123571663E-003  0.000000000000000E+000
   1.01104694005264       0.000000000000000E+000
   1.01492362334111       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
