         180           8
   19.2297345854203        18.5940145544482        17.8747831043041     
   17.1390002450892        16.2985891994317        15.5565569204984     
   14.8322657464103        14.1914810788133     
  -6.21153800979483       -6.39488820816570       -6.51843343768912     
  -6.67098642139062       -6.78135691691912       -6.95294320585298     
  -7.12457069127870       -7.29358850560150     
 -7.807162819796422E-003  0.000000000000000E+000
   1.01119597475489       0.000000000000000E+000
   1.01497825173589       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
