         180           8
   23.2939366777206        22.4737178720690        21.5045308292113     
   20.6274536694857        19.9458959115678        19.2219257988454     
   18.5084115332724        17.6136278610521     
  -8.32852616861488       -3.92956355788950       -5.41116242423062     
  -6.32537933059070       -6.74451692249153       -7.07289796075099     
  -7.28126523359736       -7.43402284429918     
 -7.718946020488283E-003  0.000000000000000E+000
   1.01153636599488       0.000000000000000E+000
   1.01516397634474       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
