         180           8
   16.9377180277601        16.1538266368925        15.5521802093133     
   14.8449503498231        14.0643405473666        13.2748909481100     
   12.5106355235900        11.7770378015041     
  -6.89359380320626       -6.90565015472283       -7.01051831064891     
  -7.14367834155983       -7.31742698402069       -7.48237406980559     
  -7.61630557400987       -7.70031526488571     
 -7.865306618432362E-003  0.000000000000000E+000
   1.01126457056386       0.000000000000000E+000
   1.01505358615601       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
