         180           8
   18.8674766613527        17.9665780365292        17.1936637553960     
   16.4826531846669        15.7578312281815        14.9486160738906     
   14.1798317896157        13.5182268247833     
  -7.26790694285614       -7.37866394467363       -7.44179371194499     
  -7.57819046034243       -7.71963791724850       -7.83591328465784     
  -7.97486782823021       -8.09486128918908     
 -7.841175307701632E-003  0.000000000000000E+000
   1.01134201672916       0.000000000000000E+000
   1.01537389587350       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
