         180           8
   22.8506373661469        22.0192114379509        21.3336491996385     
   20.5969018964752        19.8623595280940        19.1767809974081     
   18.4540429027590        17.7348376980363     
  -8.25100209755044       -8.08081067704548       -8.12010591361178     
  -8.16072924958030       -8.32522423280049       -8.51214062287916     
  -8.64975354157681       -8.81836108868315     
 -7.741240597553919E-003  0.000000000000000E+000
   1.01167473391750       0.000000000000000E+000
   1.01510260892180       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
