         180           3
   18.6248316717550        19.9714257586313        21.6180776750224     
  -8.41225628967887       -7.67017592436397       -6.65206841741042     
  2.190007486872664E-003  0.000000000000000E+000
  0.987847062466114       0.000000000000000E+000
  0.985163915372754       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
