         180           8
   13.3117919486634        12.9113828734028        12.6255765477046     
   12.4375702226732        12.2539986233689        12.0472385777468     
   11.8741894201927        11.8505330368561     
  -8.40461190294677       -8.25703222691108       -8.03014658147732     
  -7.78718535522355       -7.53088048137996       -7.27924449875421     
  -7.01052520839990       -6.70047930370001     
 -7.801674299583708E-003  0.000000000000000E+000
   1.01029779854133       0.000000000000000E+000
   1.01439861685887       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
