         180           3
   19.2774947713134        20.6046950801874        22.0353921761135     
  -9.49087442031416       -9.06955817627987       -8.20310200245699     
  2.423809246465533E-003  0.000000000000000E+000
  0.987790633749453       0.000000000000000E+000
  0.985119427175969       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
