         180           3
   18.0449360558100        19.6670943177616        21.2850136325579     
  -8.57216123322037       -7.71187921179912       -6.57226097865468     
  1.980742575211552E-003  0.000000000000000E+000
  0.987802196948803       0.000000000000000E+000
  0.985084917020674       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
