         180           8
   12.1329246689492        11.8293864674713        11.5954311704914     
   11.4097178148364        11.2537701335810        11.0773501440102     
   10.8613366573174        10.7549962201359     
  -8.86894723812794       -8.69227353482300       -8.44419632010486     
  -8.24717287686032       -7.98068604897315       -7.72246293753538     
  -7.46963756356688       -7.16158593440570     
 -8.017599012718379E-003  0.000000000000000E+000
   1.01115497239635       0.000000000000000E+000
   1.01420404957467       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
