         180           3
   18.6873944790046        20.2538176109751        21.4919165498187     
  -8.94167240136331       -8.33507089636313       -7.40788151614717     
  2.148350524324244E-003  0.000000000000000E+000
  0.987889338794946       0.000000000000000E+000
  0.985082641989645       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
