         180           8
   13.4651283848033        13.0687515498042        12.9021562530349     
   12.7654038198534        12.5088616914840        12.2186953566611     
   11.9965612841362        11.9050639841141     
  -9.02120993766968       -8.91609557067155       -8.67426585582361     
  -8.45190754529344       -8.24176872068039       -8.01182555005582     
  -7.71336763170378       -7.50405843205008     
 -8.069166927439593E-003  0.000000000000000E+000
   1.01108326159728       0.000000000000000E+000
   1.01486444927755       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
