         180           3
   17.2362368330681        19.0100496565033        20.4367715668731     
  -6.22034461839101       -5.32106714883474       -3.81148739120402     
  1.603707091055554E-003  0.000000000000000E+000
  0.987827600695705       0.000000000000000E+000
  0.985110878402570       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
