         180           8
   8.34297264687017        8.14461637208820        7.94450523735976     
   7.78907989102624        7.84576534364999        7.69333452720841     
   7.43661207218358        7.32710646263610     
  -8.18304435764481       -7.93498757494227       -7.66686095181745     
  -7.44746127170137       -7.17722159417466       -6.79714710501241     
  -6.48559003679135       -6.14037931398561     
 -8.151097584649466E-003  0.000000000000000E+000
   1.01047950838629       0.000000000000000E+000
   1.01417340274096       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
