         180           8
   10.1868030006406        10.0315325131947        9.90575240586315     
   9.76215813666115        9.48118754634202        9.27448822574185     
   9.26537396994400        8.98063558056215     
  -8.78110948218312       -8.53754485403433       -8.26582672562191     
  -7.98483034552742       -7.67677508653498       -7.34530277316306     
  -6.99492318776623       -6.67482697882866     
 -8.128534793463071E-003  0.000000000000000E+000
   1.01074954400333       0.000000000000000E+000
   1.01439839647176       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
