         180           3
   18.5254996302164        19.8923536465301        21.5589164983686     
  -9.07762618352121       -8.37773868328126       -7.40085058393736     
  2.090411647248123E-003  0.000000000000000E+000
  0.987886769450028       0.000000000000000E+000
  0.985059689419594       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
