         180           8
   13.1354461552998        12.7835285396821        12.5257437367193     
   12.2998499784645        12.0446069559543        11.8651639078165     
   11.7129502093864        11.6536317796768     
  -9.34776320975701       -9.11089825414570       -8.87349292919465     
  -8.62975699362952       -8.34943908530726       -8.08187937307061     
  -7.83508106092516       -7.46124982365001     
 -8.097738681276889E-003  0.000000000000000E+000
   1.01072586924771       0.000000000000000E+000
   1.01454086586162       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
