         180           8
   11.0064327650002        10.7007000171461        10.6078867257650     
   10.3862470619742        10.1569165090761        10.0108106903592     
   9.73860994956849        9.79122336689065     
  -8.04384660289742       -7.77113703318334       -7.52406542691461     
  -7.28307530527523       -7.02039758783971       -6.75664297973672     
  -6.41653326680829       -6.13209417050499     
 -7.937379179660840E-003  0.000000000000000E+000
   1.01027040890506       0.000000000000000E+000
   1.01448752150791       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
