         180           3
   19.0122290012841        19.8840804138974        21.2969671696115     
  -8.04497770003220       -6.96699745763281       -5.78153442162151     
  2.526977435490524E-003  0.000000000000000E+000
  0.987732775907826       0.000000000000000E+000
  0.985234498746435       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
