         180           3
   18.1435397338182        19.4889000945301        21.1124707261989     
  -7.46377316726219       -6.85727454116099       -5.90391656090790     
  2.063314945288294E-003  0.000000000000000E+000
  0.987736968231367       0.000000000000000E+000
  0.985005883483225       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
