         180           8
   13.1034904211451        12.9553508918270        12.7359154655455     
   12.4801936385892        12.2737181078113        12.0888699932261     
   11.9315688462130        11.7686615902340     
  -7.18499868793953       -6.92753885691715       -6.66745652723892     
  -6.31971105851641       -6.00774467732726       -5.78821315865310     
  -5.58817415003092       -5.33957262150883     
 -7.648285545088571E-003  0.000000000000000E+000
   1.01004698250675       0.000000000000000E+000
   1.01403286127302       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
