         180           8
   16.1985071998979        16.1126504629591        15.8156923472508     
   15.5933402716929        15.3603540147894        15.1475887822744     
   14.9385688451432        14.7914852086028     
  -7.73748950658792       -7.59355191345947       -7.31778233715842     
  -7.07306762899563       -6.81753933848682       -6.60488837425961     
  -6.45630471674611       -6.20035177504337     
 -7.546413087310337E-003  0.000000000000000E+000
   1.01002794738164       0.000000000000000E+000
   1.01375704332691       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
