         180           8
   12.5426479510648        12.1319540657247        11.9459391030860     
   11.7417847385606        11.5855422880227        11.4254253727058     
   11.2069048933854        11.0074364477734     
  -6.34855776974920       -6.09488038324812       -5.91102570528404     
  -5.68673742559947       -5.39389882829169       -5.13114800292526     
  -4.88898390347986       -4.67034564755779     
 -7.744916637463968E-003  0.000000000000000E+000
   1.01006315706218       0.000000000000000E+000
   1.01410929570130       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
