         180           3
   19.3525045282329        21.3564960214899        22.7116491774770     
  -6.51167580069434       -6.44084573155022       -4.86104586187976     
  2.360215026181576E-003  0.000000000000000E+000
  0.987902391606212       0.000000000000000E+000
  0.985323077826364       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
