         180           8
   15.2141294668318        15.0394844127705        14.8747117588137     
   14.6685650548696        14.4403451121006        14.2577730462230     
   14.0785845919235        13.9962710494331     
  -6.85009086882539       -6.44356667466900       -6.08405673542061     
  -5.84347203239702       -5.67501319336604       -5.43450695752576     
  -5.18847951791265       -5.08799934722057     
 -7.428775556091169E-003  0.000000000000000E+000
   1.00982381307756       0.000000000000000E+000
   1.01373215239612       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
